0102030405010.0

8:38:00.0

50.0

37:40.0

29:30.0

-66:30:00.0

30.0

31:00.0

32:00.0

RA (J2000)

Dec (J2000)

OBSID 00507185000 / DATE-OBS 2011-11-07T00:51:44.6

UVOT Finding Chart