051015202530354056.0

7:52:50.0

44.0

34:00.0

30.0

35:00.0

-41:36:00.0

37:00.0

RA (J2000)

Dec (J2000)

OBSID 00507342000 / DATE-OBS 2011-11-09T03:49:28.3

UVOT Finding Chart