0510152025303504.0

12:46:00.0

56.0

45:52.0

08:30.0

09:00.0

30.0

-7:10:00.0

11:00.0

RA (J2000)

Dec (J2000)

OBSID 00509419000 / DATE-OBS 2011-12-10T14:51:28.4

UVOT Finding Chart