01234567848.0

44.0

6:04:40.0

36.0

57:30.0

-23:58:00.0

30.0

59:00.0

-24:00:00.0

RA (J2000)

Dec (J2000)

OBSID 00510075000 / DATE-OBS 2011-12-21T02:19:48.7

UVOT Finding Chart