02468101246.0

0:52:40.0

34.0

28.0

30.0

35:00.0

51:34:00.0

33:00.0

32:30.0

RA (J2000)

Dec (J2000)

OBSID 00510341000 / DATE-OBS 2011-12-25T03:52:20.6

UVOT Finding Chart