051015202519:59:50.0

44.0

38.0

18:00.0

30.0

17:00.0

35:16:00.0

15:00.0

14:30.0

RA (J2000)

Dec (J2000)

OBSID 00510963000 / DATE-OBS 2012-01-02T23:01:29.7

UVOT Finding Chart