02040608010019:59:50.0

44.0

38.0

16:00.0

30.0

35:15:00.0

14:00.0

13:00.0

RA (J2000)

Dec (J2000)

OBSID 00510962000 / DATE-OBS 2012-01-02T22:54:59.0

UVOT Finding Chart