0123456704.0

1:05:00.0

56.0

04:52.0

57:00.0

30.0

33:56:00.0

55:00.0

54:30.0

RA (J2000)

Dec (J2000)

OBSID 00511866000 / DATE-OBS 2012-01-16T18:21:09.2

UVOT Finding Chart