010203040506070809010028.0

24.0

16:37:20.0

16.0

55:30.0

56:00.0

30.0

-23:57:00.0

58:00.0

59:00.0

RA (J2000)

Dec (J2000)

OBSID 00512164000 / DATE-OBS 2012-01-21T09:56:51.3

UVOT Finding Chart