0123456704.0

5:51:00.0

50:56.0

44:30.0

45:00.0

30.0

-24:46:00.0

47:00.0

RA (J2000)

Dec (J2000)

OBSID 00514586000 / DATE-OBS 2012-02-11T12:03:17.3

UVOT Finding Chart