051015202510.0

20:04:00.0

03:50.0

26:00.0

30.0

65:25:00.0

24:00.0

23:30.0

RA (J2000)

Dec (J2000)

OBSID 00514767000 / DATE-OBS 2012-02-13T00:31:58.4

UVOT Finding Chart