0510152025302:00:10.0

06.0

02.0

30.0

48:00.0

8:47:00.0

46:00.0

RA (J2000)

Dec (J2000)

OBSID 00515015000 / DATE-OBS 2012-02-15T00:55:59.4

UVOT Finding Chart