012345672:44:00.0

56.0

52.0

43:48.0

46:00.0

30.0

47:00.0

-17:48:00.0

49:00.0

RA (J2000)

Dec (J2000)

OBSID 00515976000 / DATE-OBS 2012-02-24T04:44:37.2

UVOT Finding Chart