01234540.0

20.0

14:36:00.0

30.0

42:00.0

41:00.0

79:40:00.0

RA (J2000)

Dec (J2000)

OBSID 00517234000 / DATE-OBS 2012-03-08T06:16:24.1

UVOT Finding Chart