024681012141634.0

16:27:30.0

26.0

22.0

23:30.0

24:00.0

30.0

-29:25:00.0

26:00.0

RA (J2000)

Dec (J2000)

OBSID 00518731000 / DATE-OBS 2012-03-27T02:57:45.6

UVOT Finding Chart