010203040506036.0

16:06:30.0

24.0

18:30.0

19:00.0

30.0

-39:20:00.0

21:00.0

RA (J2000)

Dec (J2000)

OBSID 00518792000 / DATE-OBS 2012-03-28T03:07:45.1

UVOT Finding Chart