3000

3200

3400

3600

3800

4000

4200

4400

58:00.0

30.0

20:57:00.0

24:00.0

22:00.0

20:00.0

18:00.0

16:00.0

14:00.0

12:00.0

19:10:00.0

08:00.0

06:00.0

RA (J2000)

Dec (J2000)

OBSID 00519207000 / DATE-OBS 2012-04-02T23:04:01.6

UVOT Finding Chart