010203040506070809050.0

11:47:40.0

30.0

-61:57:00.0

58:00.0

59:00.0

-62:00:00.0

RA (J2000)

Dec (J2000)

OBSID 00519850000 / DATE-OBS 2012-04-10T18:02:19.7

UVOT Finding Chart