01020304050607020.0

10.0

2:22:00.0

46:00.0

30.0

59:45:00.0

44:00.0

43:00.0

RA (J2000)

Dec (J2000)

OBSID 00519874000 / DATE-OBS 2012-04-11T01:18:23.0

UVOT Finding Chart