010203040506008.0

04.0

18:45:00.0

44:56.0

32:30.0

33:00.0

30.0

-4:34:00.0

35:00.0

RA (J2000)

Dec (J2000)

OBSID 00521567000 / DATE-OBS 2012-05-05T01:51:56.8

UVOT Finding Chart