-5-4-3-2-101234514.0

14:17:10.0

06.0

02.0

42:10:00.0

30.0

09:00.0

08:00.0

07:30.0

RA (J2000)

Dec (J2000)

OBSID 00522656000 / DATE-OBS 2012-05-21T23:27:04.8

UVOT Finding Chart