3500

4000

4500

5000

5500

6000

6500

30.0

16:42:00.0

41:00.0

22:00.0

24:00.0

26:00.0

28:00.0

-45:30:00.0

32:00.0

34:00.0

36:00.0

38:00.0

40:00.0

RA (J2000)

Dec (J2000)

OBSID 00523489000 / DATE-OBS 2012-06-03T18:23:29.3

UVOT Finding Chart