0510152025303540455058.0

54.0

8:26:50.0

46.0

33:00.0

30.0

-17:34:00.0

35:00.0

36:00.0

RA (J2000)

Dec (J2000)

OBSID 00524128000 / DATE-OBS 2012-06-12T02:07:55.8

UVOT Finding Chart