024681012148:27:00.0

56.0

52.0

26:48.0

33:00.0

30.0

-17:34:00.0

35:00.0

36:00.0

RA (J2000)

Dec (J2000)

OBSID 00524128000 / DATE-OBS 2012-06-12T02:10:33.7

UVOT Finding Chart