010203040506004.0

18:41:00.0

40:56.0

34:00.0

30.0

-5:35:00.0

36:00.0

37:00.0

RA (J2000)

Dec (J2000)

OBSID 00524364000 / DATE-OBS 2012-06-14T19:18:58.4

UVOT Finding Chart