0102030405028.0

24.0

19:10:20.0

46:30.0

47:00.0

30.0

-5:48:00.0

49:00.0

RA (J2000)

Dec (J2000)

OBSID 00524642000 / DATE-OBS 2012-06-18T20:31:52.2

UVOT Finding Chart