05101520253035404530.0

17:06:20.0

10.0

41:00.0

30.0

42:00.0

-61:43:00.0

44:00.0

RA (J2000)

Dec (J2000)

OBSID 00525148000 / DATE-OBS 2012-06-25T22:57:18.0

UVOT Finding Chart