05101520253058.0

54.0

8:35:50.0

46.0

-43:10:00.0

30.0

11:00.0

12:00.0

RA (J2000)

Dec (J2000)

OBSID 00525152000 / DATE-OBS 2012-06-25T23:50:18.1

UVOT Finding Chart