012345678932.0

28.0

24.0

22:37:20.0

42:30.0

43:00.0

30.0

-29:44:00.0

45:00.0

RA (J2000)

Dec (J2000)

OBSID 00525671000 / DATE-OBS 2012-07-03T17:30:35.1

UVOT Finding Chart