0.005

0.01

0.015

0.02

0.025

50.0

22:06:40.0

30.0

03:00.0

02:00.0

01:00.0

60:00:00.0

RA (J2000)

Dec (J2000)

OBSID 00526270000 / DATE-OBS 2012-07-11T03:25:35.6

UVOT Finding Chart