05101520253035404514.0

18:01:10.0

06.0

02.0

03:30.0

04:00.0

30.0

-25:05:00.0

06:00.0

RA (J2000)

Dec (J2000)

OBSID 00526283000 / DATE-OBS 2012-07-11T09:33:50.0

UVOT Finding Chart