02040608010012011:12:00.0

56.0

52.0

11:48.0

36:30.0

37:00.0

30.0

-30:38:00.0

39:00.0

RA (J2000)

Dec (J2000)

OBSID 00526593000 / DATE-OBS 2012-07-14T08:41:15.3

UVOT Finding Chart