02468101214161812.0

08.0

04.0

17:48:00.0

45:00.0

30.0

-24:46:00.0

47:00.0

48:00.0

RA (J2000)

Dec (J2000)

OBSID 00526892000 / DATE-OBS 2012-07-16T21:04:57.4

UVOT Finding Chart