05101520253004.0

15:22:00.0

56.0

21:52.0

30.0

16:00.0

13:15:00.0

14:00.0

13:30.0

RA (J2000)

Dec (J2000)

OBSID 00528195000 / DATE-OBS 2012-07-22T13:08:07.9

UVOT Finding Chart