0510152025303540455018.0

14.0

12:26:10.0

06.0

30.0

05:00.0

18:04:00.0

03:00.0

02:30.0

RA (J2000)

Dec (J2000)

OBSID 00528925000 / DATE-OBS 2012-07-27T22:27:27.2

UVOT Finding Chart