0102030405038.0

34.0

19:10:30.0

26.0

43:30.0

44:00.0

30.0

-5:45:00.0

46:00.0

RA (J2000)

Dec (J2000)

OBSID 00529076000 / DATE-OBS 2012-07-29T07:28:12.2

UVOT Finding Chart