051015202530354022.0

18.0

14.0

17:58:10.0

41:30.0

42:00.0

30.0

-6:43:00.0

44:00.0

RA (J2000)

Dec (J2000)

OBSID 00529582000 / DATE-OBS 2012-08-03T07:24:55.0

UVOT Finding Chart