0510152025303548.0

44.0

15:35:40.0

36.0

44:00.0

30.0

45:00.0

-28:46:00.0

47:00.0

RA (J2000)

Dec (J2000)

OBSID 00529686000 / DATE-OBS 2012-08-04T00:56:00.6

UVOT Finding Chart