02468101212.0

08.0

04.0

14:26:00.0

30.0

49:00.0

5:48:00.0

47:00.0

46:30.0

RA (J2000)

Dec (J2000)

OBSID 00530031000 / DATE-OBS 2012-08-05T21:30:26.1

UVOT Finding Chart