0246810121416182016:05:00.0

54.0

48.0

04:42.0

28:00.0

30.0

29:00.0

-47:30:00.0

31:00.0

RA (J2000)

Dec (J2000)

OBSID 00530267000 / DATE-OBS 2012-08-07T07:14:34.8

UVOT Finding Chart