2200

2400

2600

2800

3000

3200

3400

3600

3800

4000

4200

13:20:00.0

19:00.0

18:00.0

28:00.0

26:00.0

24:00.0

22:00.0

62:20:00.0

16:00.0

14:00.0

12:00.0

10:00.0

RA (J2000)

Dec (J2000)

OBSID 00530689000 / DATE-OBS 2012-08-11T15:49:31.7

UVOT Finding Chart