051015202530354018:15:56.0

18:15:50.0

18:15:44.0

07:00.0

30.0

-52:08:00.0

09:00.0

RA (J2000)

Dec (J2000)

OBSID 00531003000 / DATE-OBS 2012-08-15T02:58:58.5

UVOT Finding Chart