1800

2000

2200

2400

2600

2800

3000

3200

3400

30.0

16:43:00.0

42:00.0

12:00.0

14:00.0

16:00.0

18:00.0

-38:20:00.0

22:00.0

24:00.0

26:00.0

28:00.0

30:00.0

RA (J2000)

Dec (J2000)

OBSID 00531267000 / DATE-OBS 2012-08-17T07:41:47.4

UVOT Finding Chart