02E-19

4E-19

6E-19

8E-19

1E-18

1.2E-18

1.4E-18

1.6E-18

1.8E-18

2E-18

18.0

14.0

15:46:10.0

43:00.0

30.0

-7:44:00.0

45:00.0

46:00.0

RA (J2000)

Dec (J2000)

OBSID 00531428000 / DATE-OBS 2012-08-19T13:15:40.3

UVOT Finding Chart