0246810121404.0

4:59:00.0

56.0

58:52.0

17:00.0

30.0

18:00.0

19:00.0

-9:20:00.0

RA (J2000)

Dec (J2000)

OBSID 00532871000 / DATE-OBS 2012-09-07T00:39:05.3

UVOT Finding Chart