0246810121423:02:56.0

23:02:48.0

40.0

41:30.0

42:00.0

30.0

-39:43:00.0

44:00.0

RA (J2000)

Dec (J2000)

OBSID 00534017000 / DATE-OBS 2012-09-18T12:00:28.3

UVOT Finding Chart