0102030405060708014.0

18:24:10.0

06.0

02.0

38:30.0

39:00.0

30.0

-5:40:00.0

41:00.0

RA (J2000)

Dec (J2000)

OBSID 00535026000 / DATE-OBS 2012-10-01T18:25:22.0

UVOT Finding Chart