0.51.5218:28:50.0

46.0

42.0

27:00.0

30.0

28:00.0

29:00.0

-10:30:00.0

RA (J2000)

Dec (J2000)

OBSID 00535733000 / DATE-OBS 2012-10-10T23:59:55.4

UVOT Finding Chart