01020304050607019:15:20.0

16.0

12.0

34:30.0

35:00.0

30.0

-1:36:00.0

37:00.0

RA (J2000)

Dec (J2000)

OBSID 00536172000 / DATE-OBS 2012-10-17T19:42:39.5

UVOT Finding Chart