024681012141632.0

26.0

4:14:20.0

14.0

48:30.0

49:00.0

30.0

-58:50:00.0

51:00.0

RA (J2000)

Dec (J2000)

OBSID 00536831000 / DATE-OBS 2012-10-27T07:47:07.1

UVOT Finding Chart